ϕ -3 -2 -1 0 1 2 3 efficiency

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

ATLASPreliminary | < 1.05 η CB muons | = 7 TeV s Data 2010 +μ L1_MU6 -μ L1_MU6