[GeV] Tp 0 2 4 6 8 10 12 14 16 18 20 efficiency w.r.t. to L1 and offline

0 0.2 0.4 0.6 0.8 ATLASPreliminary Data 2010

= 7 TeV s CB muons

| > 1.05 η| L1_MU0 L1_MU0 && q > 0 L1_MU0 && q < 0