znp0_pdg Entries 10 Mean -479.8 RMS 505.3

-1000 -800 -600 -400 -200 0 0

1

2

3

4

5

realJ1_pdg {(realH_m>0&&n_b_jets==0&&abs(realJ1_eta)<2.5&&abs(realJ2_eta)<2.5&&lepZ_m>20000&&lepZ_m<76000&&realZ_m>70000&&realZ_m<105000&&met<30000&&realJ2_jvf>0.75&&realJ1_jvf>0.75&&realJ1_Fisher>0.4&&realJ1_ntrk==1)*weight}