0 0.020.040.060.080.10.120.140.160.180.20.220.24 0

20

40

60

80

100

120 Input data (signal) Estimated PDF (norm. signal)

var2 signal training

0 0.020.040.060.080.10.120.140.160.180.20.220.24 0 10 20 30 40 50 60 70 80 Input data (backgr.)

Estimated PDF (norm. backgr.)

var2 background training