Fisher

-1.2 -1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6

Normalized

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 Signal data Signal PDF Background data Background PDF

TMVA output for classifier: Fisher