leadjetllm Entries 0 Mean 0.496 RMS 0.2255

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

ll for lead jet