0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0.00490196 0.00430416 0.00929615

0.0344828 0.0604396 0.0684211 0.0441558 0.0207254 0.0424929 0.0580913 0.0529595 0.0365854

0.470588 0.605839 0.504854 0.455128 0.242424 0.480916 0.607914 0.580357 0.334278

0.771429 0.730769 0.716279 0.652941 0.536232 0.765957 0.844444 0.767956 0.578947

0.6 0.798851 0.727273 0.71134 0.719512 0.924051 0.898734 0.888889 0.796117

0.615385 0.836957 0.706897 0.711111 0.808511 0.975 0.918919 0.878788 0.902439

0.333333 0.8125 0.892857 0.740741 0.789474 0.857143 0.875 0.893617 0.88

0.4 0.8 0.611111 0.785714 0.8 1 0.9 1 0.8

0.666667 0.75 1 0.8 0.916667 0.9 0.909091 0.8 0.875

η 0 0.5 1 1.5 2 2.5

Tp

0 2 4 6 8 10 12 14 16 18 20 Efficiency