0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0.00854701

0.5 0.148148 0.025641 0.0444444 0.037037 0.0746269 0.0588235

0.375 0.681818 0.731707 0.594595 0.391304 0.36 0.758621 0.659574 0.531915

0.333333 0.690476 0.863636 0.72 0.6875 0.652174 0.769231 0.8 0.787879

1 0.705882 0.625 0.692308 1 1 1 1 0.909091

1 0.714286 0.625 0.833333 1 1 1 1 0.714286

0.5 1 0.833333 1 1 1 1 0.75

0.5 1 0.666667 0.666667 1 1 1 0.8

0.777778 0.571429 0.6 0.666667 1 1 1 1

η 0 0.5 1 1.5 2 2.5

Tp

0 2 4 6 8 10 12 14 16 18 20 Efficiency