0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0.605499 0.140259 0.215868 0.275117 0.347624 0.241927

1 0.695586 0.966506 1 1 0.704124 1 0.754919

0.875 0.985478 0.985478 0.75 0.75 1 1 1

1 0.605499 0.985478 1 1

1 1 1 1 1 1 1

1 0.978885 1 0.978885 1 1 1 1 1

η 0 0.5 1 1.5 2 2.5

Tp

0 2 4 6 8 10 12 14 16 18 20 ErrorSup