0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

0.0611678 0.00259828 0.00635455 0.0105971 0.113915 0.00807321

0.82 0.395323 0.533494 0.82 0.82 0.295876 0.82 0.445081

0.625 0.681188 0.681188 0.25 0.25 0.82 0.82 0.82

0.82 0.0611678 0.681188 0.82 0.82

0.82 0.82 0.82 0.82 0.82 0.82 0.82

0.82 0.621115 0.82 0.621115 0.82 0.82 0.82 0.82 0.82

η 0 0.5 1 1.5 2 2.5

Tp

0 2 4 6 8 10 12 14 16 18 20 ErrorMin